<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">; bkgrnd2d.def : Declares the module parameters for the DLL.

LIBRARY      "BKGRND2D"
DESCRIPTION  'BKGRND2D Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Synapse_EnumerateInterfaces @1
</pre></body></html>